<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\chapter*{Check Final Print Size}

\begin{center}
{\Large --- Check final print size! ---}

\bigskip

\calibrationbox{100}{50} % width/height of box in mm

\bigskip

{\Large --- Remove this page after printing! ---}

\end{center}

</pre></body></html>